PS_VIEW v. 2.01 COMMANDS LIST (1) (press 4

PgDn or Œ

Esc )

Parameters Command Aliases Description (FILE_NAME) o a open new picture (FILE_NAME) op ap open new paged document

c !F10 redraw current picture i !F11 initialize parameter settings w !F12 view whole picture

{PAGE} pn np F̄4 go to the specified page pf fp 5

Home go to the first page

pl lp #

End go to the last page {INCR} n 4

PgDn go to the next page

{INCR} p 3

PgUp go to the previous page

g draw local window-oriented coordinates grid gg draw global coordinates grid (cm) ggg draw global coordinates grid (cm, mm) {HOR} {VER} igg initialize global grid origin wgg initialize global grid origin to the window ori. dgg initialize global grid origin to (0,0) gc switch to global coordinates lc switch to local coordinates

PS_VIEW v. 2.01 COMMANDS LIST (2) (press 3

PgUp , 4

PgDn or Œ

Esc )

Parameters Command Aliases Description {MAG} m set magnification factor {HOR} {VER} v view magnified and shifted picture {HOR} {VER} vu 3

Alt ¿ magnify picture (equiv. ’v’)

{HOR} {VER} vd 3

Alt ¡ diminish picture (equiv. ’v’ with scaling = 1MAG )

{HOR} {VER} go $

Tab shift screen (equiv. ’v’ with scaling = 1) {SHIFT} s set shift {SHIFT} l fflfl shift picture left {SHIFT} r fflfi shift picture right {SHIFT} u �ffi shift picture up {SHIFT} d �ffl shift picture down {STEP} ro X

Shift Tab rotate by STEP ľ90

hf flip picture horizontaly vf flip picture verticaly {INCR} un Œ

Del undo previous picture {INCR} re ß

Ins redo undone picture bb show document bounding box pg show document page box fr show frame (printing area)

PS_VIEW v. 2.01 COMMANDS LIST (3) (press 3

PgUp , 4

PgDn or Œ

Esc )

Parameters Command Aliases Description {(FILE_NAME)} pr~

Ctrl Print Scr print screen or send it to a file

DEVICE_NAME prs select printer (used by ’pr’) {(DEVICE)} dev select screen device r1024 set resolution (SVGA) r800 set resolution (SVGA) r640 set resolution (SVGA)

rsc F̄9 reset screen cursor

e try to recover from error (obsolete)

q 2Alt Q :Alt F4 quit saving the restart x 1Alt X ŒEsc exit without saving the restart

{(FILE_NAME)} wr F̄2 write the restart information {(FILE_NAME)} rr F̄3 read the restart information help 1

Alt H¯

F1 help ver print PS_VIEW version rev print Ghostscript revision

PS_VIEW v. 2.01 COMMANDS LIST (4) (press 3

PgUp or Œ

Esc )

Remark 1: Optional parameters appear in curly braces. Remark 2: Sequences in frames (keys) do not require pressing 1

Enter ,

they require, however, that ANSI.SYS is being installed. Remark 3: Some commands change their meaning while the help is on.